Neill-Wycik Summer Hotel 1975

Ted Hanmer - Manager 96 Gerrard Street East, Toronto, Ontario M5B 1G7 367-0320

Daily rates, floors 2 to 8:

May 13 to July 31 August single $9.00 $10.00 mini twin 11.00 12.00 small twin 12.00 13.00 large twin 13.00 14.00

A Beautiful view of the city (on the south side, the lake and the city) and a Gentle breeze are often enjoyed by guests residing on the 9th to 16th floors. A modest charge for this privelege of $1.00 per room per day is well worth the extra expense. Please request a high room.

Under normal circumstances, a cot for a person over two years of age costs $2.00; under two years it is free, if placed in an occupied room.

Except in August, a 15% reduction is available for individuals paying for at least 7 consecutive days in advance. No partial refunds are allowed when this option is chosen.

GROUP RATES FOR MAY, JUNE, JULY:

(August group discounts are available only in special circumstances, to be discussed with the manager)

14 to 24 people staying any length of time: 15% reduction on total group invoice.

25 or more people staying 1 to 3 days: 20% reduction on total group invoice.

25 or more people staying 4 days and more: 25% reductien on total group invoice.