DOUGLAS COLLEGE INTER OFFICE MEMO,

TO: ALL FACULTY AND STAFF DATE: April 25/75 FROM: Bill Day a ma Pee | mR RY

DOUGLAS RE: Sng

We have placed on file with the Personnel Office, two sets of documents:

A) A Handbook from the International Labour Office indicating main fields of activity, future program trends, and expected needs in project personnel

for 1974/75, relating to the International Labour Office Technical Cooperation Program.

B) Announcements of vacancies for the following positions:

Experts/Instructors in:

Methodology and Teaching Techniques in Vocational Training

Machine Shop and Fitting Welding, Sheetmetal, Plumbing Electricity and Electronics Woodwork-Cabinet Making Automotive and Agro-mechanics Woodwork and Carpentry Building Construction Commercial and Secretarial Training In-Plant and Mobile Unit, Mechanical Trades Domestic Electronics Consultant on Apprenticeship Industrial Electronics Teaching Techniques (Team Leader) Cooperative Education

, Field Training Development Woodwork Computer-based Business Simulations Cost Accounting Employment Planning Chief of Project Personnel Management/Organization Development Financial Management Marketing Management Labour Statistics Management Development Industrial Engineering

These posts are all foreign posts, ranging from such exotic places as Kathmandu to the steamy climate of Port Moresby. For further information contact Lock Laurie.

WLD/rg 1 oe