a! A

“MLAS Cor OLLE gg

ARCHiyeg “!BRARY

LIBRARIES' OPENING HOURS - FALL SEMESTER

COQUITLAM CAMPUS:

Monday to Thursday Friday Saturday

NEW WESTMINSTER CAMPUS Monday to Thursday Friday Saturday

RICHMOND: CAMPUS:

Monday to Thursday Friday Saturday

SURREY CAMPUS

Monday to Thursday

Friday Saturday

7:45 a.m. 7:45 a.m. Closed

7:45 a.m. 7:45 a.m. 9:00 a.m.

7:45 a.m. 7:45 a.m. 9:00 a.m.

7:45 a.m. 7:45 a.m, 9:00 a.m.

NEWION CENTRE will have a Library staff member on

Monday to Friday Saturday

duty as follows:

8:30 a.m. -— 4:00 p.m.

Closed

Library services will continue to be offered at Langley and Maple Ridge campuses through the Campus Principal's office.