League standings as of Feb. 22, 1974

Team Games Played Won. Lost Tied Points BCITF 13 8 4 ] 17 CBI 12 6 5 ] 13 DC 12 5 6 ] 11 TWC 13 A 8 ] 9

Team Douglas Individual Scoring Statistics

Player Games Played Goals Assists Points

So a

16 14 12

Ron Hovey 11 Ken Zakala 11 Al Lewis 1] Pat Ponti 8 Steve Yesowick * 5 Gene Guiricich 1] Ron Ames 10 John Tucker

Neil Tyerman Roy Moyer

Keith MacKenzie - Rick Berry * Rick Matheson Gary Cleverley Gene DellaMattia Don Funk

Brian Erickson Wes Hawkes

Len Millis * Paul Smith

Bill Bonner

Don Nicks *

_ oO

DOODCVCVC0OH]$0 HHH HNN woON Po COOH HB 40 ON ]—NNHNABWYUMH DOO HM HH HH MK NNN WWHOA~N OC

POH HWOWHOUNTMO—-OoOD

* no longer with team

Goalkeeper Statistics

Goals Against Player Games Played Goals Against Average

Peter Collins 6 18 3.00 John MacKenzie 4 24 6.00 Don Nicks * ] ] 1.00

* no longer with team